Northwestern University, EECS Department July 27, 1995

Figure 1

Using

Chris Walsh

Computer Science and Engineering Laboratory

Electrical Engineering and Computer Science

Northwestern University

is a Microsoft Windows application which computes S/KEY� one-time

passwords, given an S/KEY challenge and a user’s secret password. It is designed to

be used in conjunction with the S/KEY authentication system, the local

implementation of which is described in The S/Key Password System, a separate

document available in the CSEL office. Used in conjunction with the Windows

Clipboard, is a very convenient and easy-to-use means of calculating S/KEY

passwords.

KEYAPP.EXE and its source code are available in the CSEL office, or in the

directory from any departmental Sun. To install

the program, simply copy it into the location of your choice on your PC. You may

wish to create an icon for it, so that it can be started via a mouse click under

Windows. Your Windows manual or on-line help explains how to do this.

To run the program, click on its icon,

or use "File->Run" from the Program

Manager menu bar. When

runs, it will pop up a window (see Figure

). If you’ve already cut the S/KEY

challenge to the Windows Clipboard,

you can paste it into by

clicking on the circular button.

Alternatively, you can type the

challenge into the top data-entry field.

You should then enter your secret password in the obvious location, and click on the

button. Your secret password will not be shown

when you enter it. Your S/KEY one-time password for this session will appear in the

box labelled . If you click on the button labelled

, the password will be copied to the Windows Clipboard, from

which it can be pasted into the waiting session.

Northwestern University, EECS Department July 27, 1995

Additional Information

Additional information concerning the program is available via the button.

Macintosh users should refer to the document Using S/KEY the Mac, which describes

similar software for the Macintosh platform.

UNIX users should refer to the on-line man pages for and , as well as to

The S/Key Password System.

DOS users should refer to the document Using , or to the on-line man

page for (although it is a DOS program, there is a UNIX-style man page

for ).